<!-- wp:html -->
<div style="width: 100vw; position: relative; left: 50%; right: 50%; margin-left: -50vw; margin-right: -50vw;">
    <iframe src="https://www.nuage.ooo/galerie_auto.php?folder=Camera" 
            width="100%" 
            height="1500px" 
            frameborder="0" 
            scrolling="yes" 
            style="display:block;">
    </iframe>
</div>
<!-- /wp:html -->