<!-- wp:html -->
<div style="width: 100%; border: none; overflow: hidden;">
    <iframe src="https://www.nuage.ooo/galerie_auto.php" 
            width="100%" 
            height="1200px" 
            style="border:none;">
    </iframe>
</div>
<!-- /wp:html -->