<!-- wp:html -->
<div style="width: 100%; text-align: center;">
    <iframe src="https://www.nuage.ooo/galerie_auto.php?folder=Camera" 
            width="100%" 
            height="1200px" 
            style="border:none; min-width: 100%;">
    </iframe>
</div>
<!-- /wp:html -->