<!-- wp:html -->
<div style="width: 100% !important; max-width: 100% !important; margin: 0 auto; padding: 0;">
    <iframe src="https://www.nuage.ooo/galerie_auto.php?folder=Camera" 
            width="100%" 
            height="1500px" 
            style="border:none; width: 100% !important; display: block;" 
            scrolling="no">
    </iframe>
</div>
<!-- /wp:html -->