<!-- wp:html -->
<div class="galerie-fullwidth" style="width: 100vw; position: relative; left: 50%; right: 50%; margin-left: -50vw; margin-right: -50vw; overflow: hidden;">
    <iframe src="https://www.nuage.ooo/galerie_auto.php" 
            width="100%" 
            height="1500px" 
            frameborder="0" 
            scrolling="yes"
            style="display: block; border: none;">
    </iframe>
</div>
<!-- /wp:html -->